%
% LaTeX test file for combinedgraphics package
%
% Copyright 2009,2011 Christian Schneider <software(at)chschneider(dot)eu>
%
% This file is part of combinedgraphics.
%
% combinedgraphics is free software: you can redistribute it and/or modify
% it under the terms of the GNU General Public License version 3 as
% published by the Free Software Foundation, not any later version.
%
% combinedgraphics is distributed in the hope that it will be useful,
% but WITHOUT ANY WARRANTY; without even the implied warranty of
% MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
% GNU General Public License for more details.
%
% You should have received a copy of the GNU General Public License
% along with combinedgraphics.  If not, see <http://www.gnu.org/licenses/>.
%
% WARNING: THIS IS ALPHA SOFTWARE AND MAY CONTAIN SERIOUS BUGS!
%

\documentclass[DIV12]{scrartcl}

\usepackage{combinedgraphics}

\newcommand*\mycolor{\color{blue}}
\newcommand*\myfont{\bfseries\Large}
\newcommand*\combinput[1]{%
  \begin{picture}(0,0)%
    \includegraphics{#1}%
  \end{picture}%
  \input{#1}%
}

\begin{document}
  \section*{Defaults}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics{xfig325}}%
  \fbox{\includecombinedgraphics{gnuplot42}}

  \section*{Test: \texttt{textfont} and \texttt{textcolor}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[textfont=\myfont,textcolor=\mycolor]{xfig325}}%
  \fbox{\includecombinedgraphics[textfont=\myfont,textcolor=\mycolor]{gnuplot42}}

  \section*{Test: \texttt{vecscale=1.2}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[vecscale=1.2]{xfig325}}%
  \fbox{\includecombinedgraphics[vecscale=1.2]{gnuplot42}}

  \section*{Test: \texttt{vecfile}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[vecfile=gnuplot42]{xfig325}}%
  \fbox{\includecombinedgraphics[vecfile=xfig325]{gnuplot42}}

  \section*{Test: \texttt{vecinclude=false}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[vecinclude=false]{xfig325}}%
  \fbox{\includecombinedgraphics[vecinclude=false]{gnuplot42}}

  \section*{Test: \texttt{vecinclude=overwrite}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[vecinclude=overwrite]{xfig325}}%
  \fbox{\includecombinedgraphics[vecinclude=overwrite]{gnuplot42}}

  \section*{Test: \texttt{angle=90}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[angle=90]{xfig325}}%
  \fbox{\includecombinedgraphics[angle=90]{gnuplot42}}

  \section*{Test: \texttt{scale=0.8}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[scale=0.8]{xfig325}}%
  \fbox{\includecombinedgraphics[scale=0.8]{gnuplot42}}

  \section*{Test: \texttt{hscale=1.2,vscale=0.8}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[hscale=1.2,vscale=0.8]{xfig325}}%
  \fbox{\includecombinedgraphics[hscale=1.2,vscale=0.8]{gnuplot42}}

  \section*{Test: \texttt{width=0.49\textbackslash textwidth,height=5cm}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[width=0.49\textwidth,height=5cm]{xfig325}}%
  \fbox{\includecombinedgraphics[width=0.49\textwidth,height=5cm]{gnuplot42}}

  \section*{Test: \texttt{width=0.49\textbackslash textwidth,keepaspectratio}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[width=0.49\textwidth,keepaspectratio]{xfig325}}%
  \fbox{\includecombinedgraphics[width=0.49\textwidth,keepaspectratio]{gnuplot42}}

  \section*{Test: \texttt{angle=30,scale=0.75,angle=15}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[angle=30,scale=0.75,angle=15]{xfig325}}%
  \fbox{\includecombinedgraphics[angle=30,scale=0.75,angle=15]{gnuplot42}}

  \section*{Test: \texttt{vecfirst=false,vecinclude=overwrite}}
  \noindent
  \fbox{\combinput{xfig325}}%
  \fbox{\input{gnuplot42}}\\
  \fbox{\includecombinedgraphics[vecfirst=false,vecinclude=overwrite]{xfig325}}%
  \fbox{\includecombinedgraphics[vecfirst=false,vecinclude=overwrite]{gnuplot42}}
\end{document}
