\input heading
%\newbox\graph
\addtolength{\textwidth}{3cm}
\addtolength{\hoffset}{-1.5cm}
\addtolength{\textheight}{4cm}
\addtolength{\voffset}{-1in}
\setcounter{topnumber}{3}

% Left-justified captions
\makeatletter
\long\def\@makecaption#1#2{%
  \vskip\abovecaptionskip
  \sbox\@tempboxa{#1: #2}%
  \ifdim \wd\@tempboxa >\hsize
    #1: #2\par
  \else
    \global \@minipagefalse
    \hb@xt@\hsize{\box\@tempboxa\hfil}%
  \fi
  \vskip\belowcaptionskip}
\makeatother

\begin{document}
\title{M4 Macros for Electric Circuit Diagrams in \LaTeX\ Documents}
\author{Dwight Aplevich}
\date{%
\input Version
\vspace*{-\baselineskip}
}
\maketitle

\input body

\bibliographystyle{plain}
\bibliography{CMman}
   \end{document}
